Uchwała Nr XXIX/157/17
Rady Gminy Głowno

z dnia 30 marca 2017 r.

uchylająca uchwałę w sprawie utworzenia Środowiskowego Domu Samopomocy w Woli Zbrożkowej oraz uchwalenia jego statutu.

Na podstawie art.18 ust.2 pkt 15 ustawy z dnia 8 marca o samorządzie gminnym (tj. Dz.U.2016.446 j.t., zm. 1579, 1948) i art.51c ust.1 ustawy z dnia 12 marca 2004 r. o pomocy społecznej (Dz.U.2016.930 j.t., zm. 753, 1583, 2174)  uchwala się, co następuje :

§ 1. Uchyla się Uchwałę  Nr XXIII/115/12 Rady Gminy Głowno z dnia 14 sierpnia 2012 roku w sprawie utworzenia Środowiskowego Domu Samopomocy w Woli Zbrożkowej oraz uchwalenia jego statutu.

§ 2. Wykonanie uchwały powierza się Wójtowi Gminy Głowno.

§ 3. Uchwała podlega ogłoszeniu w Dzienniku Urzędowym Województwa Łódzkiego i wchodzi w życie po upływie 14 dni od dnia ogłoszenia.

Przewodniczący Rady Gminy Głowno

Łukasz Łukasik