Uchwała Nr XXXI/172/17
Rady Gminy Głowno

z dnia 31 maja 2017 r.

w sprawie określenia zasad i trybu postępowania przy udzielaniu dotacji celowej na realizację zadań z zakresu ochrony środowiska i gospodarki wodnej.

Na podstawie art. 7 ust. 1 pkt 3, 18 ust. 2 pkt 15, art. 41 ust. 1 i art. 42 ustawy z dnia 8 marca 1990 roku o samorządzie gminnym (Dz.U.2016.446 j.t.; zm.1579, 1948; z 2017 r. poz. 730), art. 403 ust. 2, 3, 4, 5, 6 ustawy z dnia 27 kwietnia 2001 roku - Prawo ochrony środowiska (Dz.U.2017.519 j.t.) uchwala się, co następuje:

Rozdział 1.
Zasady udzielania dotacji celowej

§ 1. 1. Z budżetu Gminy Głowno mogą być udzielane dotacje celowe na finansowanie zadań określonych w załączniku do niniejszej uchwały, zgodnie z art. 403 ustawy - Prawo ochrony środowiska, realizowanych na terenie Gminy Głowno.

2. Dotacje celowe będą udzielane na inwestycje, które mają na celu osiągnięcie poprawy stanu środowiska i zmniejszenie uciążliwości wynikających z jego zanieczyszczenia dla mieszkańców Gminy Głowno.

3. Dotacja celowa może być udzielona podmiotom określonym w art. 403 ust. 4, pkt 1 i 2 ustawy - Prawo ochrony środowiska.

§ 2. 1. Łączną kwotę dotacji określa uchwała Rady Gminy Głowno w sprawie uchwalenia budżetu na dany rok.

2. Dotacja celowa może być udzielona dla podmiotów określonych w § 1 ust. 3 w wysokości określonej w regulaminie dofinansowania poszczególnych celów, stanowiącym załącznik do niniejszej uchwały.

Rozdział 2.
Tryb udzielania dotacji

§ 3. 1. Podmioty ubiegające się o uzyskanie dotacji celowej na zadania określone w § 1 ust. 1 składają pisemny wniosek w tym zakresie.

2. Wnioski o przyznanie dotacji celowej do budowy przydomowych oczyszczalni ścieków, weryfikuje pod względem formalnym i merytorycznym Urząd Gminy Głowno, stanowisko ds. gospodarki wodnej i ochrony środowiska.

3. Realizacja wniosków prowadzona będzie do wyczerpania środków finansowych przeznaczonych w budżecie gminy na ww. zadania w danym roku budżetowym.

Rozdział 3.
Zawarcie umowy w sprawie udzielenia dotacji celowej. Sposób rozliczenia dotacji celowej

§ 4. Udzielanie dotacji celowej następuje na podstawie umowy jednostki samorządu terytorialnego z podmiotem określonym w § 1 ust. 3.

§ 5. Podstawą rozliczenia dotacji będą udokumentowane koszty inwestycji (faktury, rachunki). Gmina Głowno zastrzega sobie także prawo dokonania kontroli faktycznego wykonania inwestycji, jak również jej funkcjonowania w wyznaczonym okresie czasu.

§ 6. Wykonanie uchwały powierza się Wójtowi Gminy Głowno.

§ 7. Traci moc Uchwała Nr XXIX/155/17 Rady Gminy Głowno z dnia 30 marca 2017 roku w sprawie określenia zasad i trybu postępowania przy udzielaniu dotacji celowej na realizację zadań z zakresu ochrony środowiska i gospodarki wodnej.

§ 8. Uchwała wchodzi w życie po upływie 14 dni od dnia ogłoszenia w Dzienniku Urzędowym Województwa Łódzkiego. 

Przewodniczący Rady  Gminy Głowno

Łukasz Łukasik

Załącznik do Uchwały Nr XXXI/172/17
Rady Gminy Głowno
z dnia 31 maja 2017 r.

REGULAMIN UDZIELANIA DOTACJI ZE ŚRODKÓW BUDŻETU GMINY DO BUDOWY PRZYDOMOWYCH OCZYSZCZALNI ŚCIEKÓW NA TERENIE GMINY GŁOWNO

1. Gmina Głowno udzieli dotacji posiadaczom nieruchomości określonym w § 1 ust. 3 uchwały, którzy w danym roku wybudują przydomową oczyszczalnię ścieków na terenie Gminy Głowno, gdzie nie istnieje możliwość podłączenia się do systemu zbiorczej kanalizacji sanitarnej.

2. Wnioski mieszkańców, którzy wybudowali przydomowe oczyszczalnie ścieków w latach wcześniejszych oraz przed wejściem w życie uchwały nr XXXI/172/17 Rady Gminy Głowno z dnia 31maja 2017 roku nie będą rozpatrywane.

3. Dotacja udzielana jest wyłącznie posiadaczom nieruchomości wytwarzającym ścieki bytowo-gospodarcze, po podpisaniu umowy z Gminą Głowno. Udzielenie dotacji nastąpi:

1) w przypadku montażu przydomowej oczyszczalni ścieków przez specjalistyczną firmę - na podstawie faktury oraz protokołu odbioru podpisanego przez wykonawcę instalacji. Zakup i montaż urządzenia przydomowej oczyszczalni ścieków musi nastąpić po podpisaniu umowy z Gminą Głowno;

2) w przypadku montażu przydomowej oczyszczalni ścieków w tzw. „systemie gospodarczym” - na podstawie faktury, rachunku za zakup urządzenia oraz podpisanego oświadczenia o montażu przydomowej oczyszczalni ścieków zgodnie z instrukcją i schematem montażu. Zakup i montaż urządzenia musi nastąpić po podpisaniu umowy z Gminą Głowno.

4. Za termin wybudowania przydomowej oczyszczalni ścieków uznawana jest:

1) w przypadku montażu przez specjalistyczną firmę – data zakończenia montażu przydomowej oczyszczalni ścieków potwierdzona podpisanym przez firmę protokołem odbioru;

2) w przypadku montażu przydomowej oczyszczalni ścieków w tzw. „systemie gospodarczym” - data podana przez właściciela w oświadczeniu o montażu przydomowej oczyszczalni ścieków zgodnie z instrukcją i schematem montażu.

5. Wybudowanie i eksploatacja przydomowej oczyszczalni ścieków musi spełniać wymogi zawarte w rozporządzeniu Ministra Środowiska z dnia 18 listopada 2014 roku w sprawie warunków, jakie należy spełnić przy wprowadzaniu ścieków do wód lub do ziemi oraz w sprawie substancji szczególnie szkodliwych dla środowiska wodnego (Dz.U.2014.1800).

6. Dotacja udzielana jest jednorazowo na częściowe pokrycie kosztów inwestycji i wynosi maksymalnie 50% kosztu zakupu urządzenia wraz z montażem, nie więcej jednak niż 2 500,00 zł.

7. Dotacją objęte są tylko urządzenia i materiały fabrycznie nowe i zamontowane po raz pierwszy.

8. Jeżeli nieruchomość znajduje się we współwłasności, wymagana jest zgoda wszystkich współwłaścicieli na budowę oczyszczalni oraz oświadczenie o wyrażeniu zgody na wypłacenie dotacji współwłaścicielom ponoszącym koszty budowy, wraz z określeniem proporcjonalnej wielkości poniesionych przez nich kosztów. Dotacja udzielana jest proporcjonalnie do poniesionych kosztów.

9. W przypadku podłączenia dwu lub więcej budynków do jednej przydomowej oczyszczalni ścieków o dotację mogą ubiegać się te osoby, które udokumentują poniesione koszty zakupu urządzeń oczyszczających ścieki. Dotacja zostanie wypłacona w proporcjach określonych przez wnioskodawców.

10. Udzielenie dotacji realizowane będzie zgodnie z zawartą umową pomiędzy Gminą Głowno a wnioskodawcą, po zgłoszeniu wykonania prac przez wnioskodawcę i stwierdzeniu przez przedstawicieli Gminy Głowno zakończenia budowy przydomowej oczyszczalni ścieków.

11. Wnioski wraz z dokumentami wymienionymi w pkt 12 niniejszego regulaminu będą rozpatrywane według kolejności złożenia kompletnych wniosków, do wyczerpania środków finansowych przeznaczonych na ten cel. Wznowienie rozpatrywania wniosków może nastąpić w przypadku pojawienia się dodatkowych środków lub w przypadku rezygnacji z wykonywania inwestycji przez podmioty zakwalifikowane do przyznania dofinansowania. Niezrealizowane w danym roku wnioski, zostaną rozpatrzone w pierwszej kolejności w roku następnym, jeżeli:

1) utrzymana zostanie w mocy uchwała nr XXXI/172/17 Rady Gminy Głowno z dnia 31maja 2017 roku wraz z załącznikiem;

2) Gmina Głowno przeznaczy na ten cel środki ze swojego budżetu;

3) dochowane zostaną przez wnioskodawcę warunki zawarte we wniosku, regulaminie i złożona zostanie wymagana dokumentacja. W przypadku nie dochowania warunków przez którąkolwiek ze stron, niezrealizowane wnioski tracą ważność z upływem roku kalendarzowego.

12. Wykaz dokumentów, które należy złożyć celem ubiegania się o dotację przed rozpoczęciem budowy przydomowej oczyszczalni ścieków:

1) wniosek posiadacza nieruchomości o udzielenie dotacji do budowy przydomowej oczyszczalni ścieków;

2) zawiadomienie starosty o przyjęciu zgłoszenia budowy przydomowej oczyszczalni ścieków;

3) oświadczenie współwłaścicieli, o którym mowa w punkcie 8.

13. Wykaz dokumentów, które należy złożyć po zakończeniu budowy:

1) faktura za montaż przydomowej oczyszczalni ścieków i protokół odbioru przez specjalistyczną firmę lub oświadczenie właściciela o montażu przydomowej oczyszczalni ścieków zgodnie z instrukcją i schematem montażu z podaniem daty montażu;

2) faktura, rachunek za zakup urządzenia;

3) certyfikat zgodności urządzenia, zgodnie z ustawą o systemie oceny zgodności z 30 sierpnia 2002 r. (Dz.U.2016.655 j.t.).

14. Termin składania wniosków o udzielenie dotacji w 2017 roku określa się od 1 lipca do 31 sierpnia. Począwszy od roku 2018 wnioski będą przyjmowane w terminie od 1 kwietnia do 15 czerwca danego roku kalendarzowego.